/*
 Navicat Premium Data Transfer

 Source Server         : mytest
 Source Server Type    : MySQL
 Source Server Version : 80018
 Source Host           : 192.168.52.76:3306
 Source Schema         : sparchetype

 Target Server Type    : MySQL
 Target Server Version : 80018
 File Encoding         : 65001

 Date: 18/03/2020 08:15:55
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for sp_flow_oper_relation
-- ----------------------------
DROP TABLE IF EXISTS `sp_flow_oper_relation`;
CREATE TABLE `sp_flow_oper_relation`  (
  `id` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '主键id',
  `flow_id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '流程ID',
  `flow` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '流程代码',
  `per_oper_id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '前道工序ID',
  `per_oper` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '前道工序代码',
  `oper_id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '当前工序ID',
  `oper` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '当前工序\r\n',
  `next_oper_id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '下道工序ID',
  `next_oper` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '下道工序',
  `sort_num` int(11) NOT NULL COMMENT '排序',
  `oper_type` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '工序类型（首道工序firstOper;最后一道工序lastOper）',
  `create_time` datetime(0) NOT NULL COMMENT '创建时间',
  `create_username` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '创建人',
  `update_time` datetime(0) NOT NULL COMMENT '最后更新时间',
  `update_username` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '最后更新人',
  PRIMARY KEY (`id`) USING BTREE,
  INDEX `flow_id_index`(`flow_id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci COMMENT = '流程与工序关系表' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
